0 0.5 1 1.5 2 2.5 x 10^4 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Time (msec)

Power (Watt)

Impact of signal strength in 3G

-99 dBm -49 dBm