0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 0 5000

10000

Power (Watts)

Time (ms)

Different power levels over 20 seconds for a 4 MB download

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 0 5000

10000

Power (Watts)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 0 5000

10000

Power (Watts)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 0 5000

10000

Power (Watts)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 0 5000

10000

Power (Watts)

-63 dBm

-51 dBm

-101 dBm

-89 dBm

-77 dBm